fecalenergy_ashok Entries 115598 Mean 101.6 RMS 16.68

60 80 100 120 140 160 0 50 100 150 200 250 300 350 fecalenergy_ashok Data from All 100 GeV e- Runs (12635-12653) Combined for below 3 plots

fecalenergy_pawel Entries 114985 Mean 105.8 RMS 9.927 / ndf

2χ 77.76 / 49 Prob 0.005532 Constant 6.9±

907.2 Mean 0.0±

108.7 Sigma 0.031±

3.888

60 70 80 90 100 110 120 130 140 150 0 100 200 300 400 500 600 700 800 900 fecalenergy_pawel

fecalenergy_pawel

fecalenergy_shashi Entries 116151 Mean 98.06 RMS 7.82 / ndf

2χ 48.73 / 37 Constant 8.2±

1043 Mean 0.0±

100.2 Sigma 0.035 ± 3.444

70 80 90 100 110 120 130 140 0

200

400

600

800

1000 fecalenergy_shashi

±

fecalenergy_shashi