Prob 0.2212 Constant 2.8±

223.4 Mean 0.1±

26.3 Sigma 0.049 ± 4.775

0 10 20 30 40 50 60 70 0

50

100

150

200

250 ±

30 GeV Pion, Int. in HB^{Prob 0.7863}_{Constant 2.4± 173.1}

Mean 0.08±

45.44 Sigma 0.093 ± 6.109

10 20 30 40 50 60 70 80 90 100 0 20 40 60 80 100 120 140 160 180

Prob 0.7863 Constant 2.4±

173.1

±

50 GeV Pion, Int. in HB^{Prob 0.05245}_{Constant 3.0± 224.5}

Mean 0.11±

97.54 Sigma 0.116 ± 9.324

40 60 80 100 120 140 160 180 200 0

50

100

150

200

250 Prob 0.05245 Constant 3.0±

224.5

±

100 GeV Pion, Int. in HB

Prob 0.9846 Constant 2.4±

177.5 Mean 0.1±

147.7 Sigma 0.14±

11.74

80 100 120 140 160 180 200 220 240 0 20 40 60 80 100 120 140 160 180 200 150 GeV Pion, Int. in HB^{Prob 0.7173}_{Constant 2.2± 170.4}

Mean 0.2±

299.3 Sigma 0.19±

18.28

100 150 200 250 300 350 400 450 0 20 40 60 80 100 120 140 160 180 200 Prob 0.7173 Constant 2.2±

170.4

300 GeV Pion, Int. in HB