Prob 0.04134 Constant 2.5±

179.4 Mean 0.08±

25.69 Sigma 0.082 ± 5.834

0 10 20 30 40 50 60 70 0 20 40 60 80 100 120 140 160 180 200 ±

30 GeV Pion, Int. in ECAL^{Prob 0.3436}_{Constant 2.1± 137.2}

Mean 0.12±

45.14 Sigma 0.177 ± 7.566

10 20 30 40 50 60 70 80 90 100 0 20 40 60 80 100 120 140 160 Prob 0.3436 Constant 2.1±

137.2

±

50 GeV Pion, Int. in ECAL^{Prob 0.8797}_{Constant 2.8± 197}

Mean 0.14±

96.84 Sigma 0.16±

10.61

40 60 80 100 120 140 160 180 200 0 20 40 60 80 100 120 140 160 180 200 220 Prob 0.8797 Constant 2.8±

197

100 GeV Pion, Int. in ECAL

Prob 0.1951 Constant 2.2±

152.6 Mean 0.2±

148.1 Sigma 0.21±

13.47

80 100 120 140 160 180 200 220 240 0 20 40 60 80 100 120 140 160 180 150 GeV Pion, Int. in ECAL^{Prob 0.7134}_{Constant 2.1± 152.9}

Mean 0.2±

302.8 Sigma 0.22±

19.69

100 150 200 250 300 350 400 450 0 20 40 60 80 100 120 140 160

Prob 0.7134 Constant 2.1±

152.9

300 GeV Pion, Int. in ECAL